E_T (GeV)

Smearing Correction

E_T (GeV)

CS Error From Res. Systematics

0.8 0.82

0.84

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1

50 100 150 200 250 300 350 400 450 500

0.94

0.96

0.98 1 1.02

1.04

1.06

50 100 150 200 250 300 350 400 450 500