0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

CTEQ4M

CTEQ5M MRST

GRV98

NA 51

x d^_ / u^_

Systematic Error

FNAL E866/NuSea Drell-Yan